Noncrossing r1 Noncrossing r4 Noncrossing r3 Noncrossing r2 Noncrossing r1 r2 Noncrossing r3 r4 Noncrossing r2 r4 Noncrossing r2 r3 Noncrossing r1 r4 Noncrossing r1 r3 Noncrossing r4 r6 Noncrossing r1 r12 Noncrossing r4 r10 Noncrossing r4 r19 Noncrossing r2 r3 r4 Noncrossing r1 r3 r4 Noncrossing r1 r2 r4 Noncrossing r1 r2 r3 Noncrossing r1 r2 r3 r4 Noncrossing r2 r24 Crossing r1 r25 Crossing r1 r15 Crossing r1 r37 Crossing r1 r20 Crossing r1 r41 Crossing r1 r60 Crossing r2 r55 Crossing r1 r29 Crossing r3 r37 Crossing r3 r14 Crossing r1 r22 Crossing r2 r11 Crossing r1 r31 Crossing r3 r12 Crossing r2 r38 Crossing r2 r19 Crossing r2 r32 Crossing r1 r33 Crossing r1 r39 Crossing r1 r43 Crossing r1 r58 Crossing r2 r59 Crossing r2 r40 Crossing r3 r25 Crossing r1 r56 Crossing r2 r44 Crossing r1 r48 Crossing r3 r29 Crossing r2 r10 Crossing r2 r4 r40 Crossing r1 r3 r37 Crossing r1 r25 r43 Crossing r2 r19 r24 Crossing r1 r2 r40 Crossing r2 r4 r55 Crossing r2 r3 r14 Crossing r1 r4 r40 Crossing r1 r15 r46 Crossing r1 r15 r24 Crossing r1 r20 r46 Crossing r1 r29 r40 Crossing r2 r11 r23 Crossing r1 r3 r31 Crossing r1 r4 r56 Crossing r2 r4 r32 Crossing r1 r4 r42 Crossing r1 r3 r12 Crossing r1 r4 r45 Crossing r1 r4 r25 Crossing r1 r15 r60 Crossing r2 r3 r60 Crossing r1 r12 r15 Crossing r1 r15 r32 Crossing r1 r22 r40 Crossing r1 r29 r42 Crossing r2 r4 r19 Crossing r1 r2 r59 Crossing r1 r15 r29 Crossing r1 r4 r15 Crossing r1 r22 r32 Crossing r1 r3 r48 Crossing r1 r29 r35 Crossing r1 r12 r58 Crossing r1 r3 r22 Crossing r1 r20 r59 Crossing r1 r3 r56 Crossing r1 r2 r32 Crossing r1 r20 r27 Crossing r1 r20 r42 Crossing r1 r22 r59 Crossing r1 r4 r35 Crossing r2 r4 r38 Crossing r2 r4 r10 Crossing r1 r4 r41 Crossing r1 r41 r46 Crossing r1 r2 r24 Crossing r1 r3 r41 Crossing r1 r20 r25 Crossing r1 r3 r39 Crossing r1 r20 r45 Crossing r1 r3 r29 Crossing