0.005

0.01

0.015

0.02 0 0.1 0.2

0.16

0.18 0.2

Susceptible Population

(A)

Incubated Population

Infected Population

0.005

0.01

0.015

0.02 0 0.1 0.2

0.16

0.18 0.2

Susceptible Population

(B)

Incubated Population

0.005

0.01

0.015

0.02 0 0.1 0.2

0.16

0.18 0.2

Susceptible Population

(C)

Incubated Population

0.005

0.01

0.015

0.02 0 0.1 0.2

0.16

0.18 0.2

Susceptible Population

(D)

Incubated Population